Latitude and Longitude - This tells where you are on the Earth. The latitude
is measured in degrees north or south of the equator, and can have a
value of 0 to 90. The longitude is a measure of "how far around" the globe
you are, measured in degrees east or west of Greenwich Observatory,
England.