This panel shows how far away the Sun and Moon are, and when they
rise and set. It is updated every time you make a change, and
automatically every second.

The times given for Sunrise and Sunset are accurate to within 5 minutes;
the times given for Moonrise and Moonset are only accurate to within 45
minutes.