This screen shows a more detailed view of the Moon on the day you have
chosen. You may set the date, time, latitude and longitude. You may also
"animate" the image. This shows how the Moon would look every twelve
hours, and draws a new picture three times each second. You may also
reverse the direction of the animation. When you are done, the panel
reverts to the date and time it had when you began the animation.